/*
 Navicat Premium Data Transfer

 Source Server         : git.aixiao.me_3306
 Source Server Type    : MySQL
 Source Server Version : 50740
 Source Host           : git.aixiao.me:3306
 Source Schema         : raspberrypi

 Target Server Type    : MySQL
 Target Server Version : 50740
 File Encoding         : 65001

 Date: 21/03/2024 10:57:51
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for gas
-- ----------------------------
DROP TABLE IF EXISTS `gas`;
CREATE TABLE `gas`  (
  `ID` int(11) NOT NULL AUTO_INCREMENT,
  `TIME` datetime NULL DEFAULT NULL,
  `CO` varchar(255) CHARACTER SET utf8 COLLATE utf8_croatian_ci NULL DEFAULT NULL,
  `CO2` varchar(255) CHARACTER SET utf8 COLLATE utf8_croatian_ci NULL DEFAULT NULL,
  `CH4` varchar(255) CHARACTER SET utf8 COLLATE utf8_croatian_ci NULL DEFAULT NULL,
  `TEMPERATURE` varchar(255) CHARACTER SET utf8 COLLATE utf8_croatian_ci NULL DEFAULT NULL,
  `RP2040_TEMPERATURE` varchar(255) CHARACTER SET utf8 COLLATE utf8_croatian_ci NULL DEFAULT NULL,
  PRIMARY KEY (`ID`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_croatian_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
